type=page
status=published
title=enable-http-lb-server
next=enable-monitoring.html
prev=enable-http-lb-application.html
~~~~~~
enable-http-lb-server
=====================

[[enable-http-lb-server-1]][[GSRFM00127]][[enable-http-lb-server]]

enable-http-lb-server
---------------------

enables a previously disabled sever or cluster managed by a load
balancer

[[sthref1111]]

Synopsis

[source,oac_no_warn]
----
asadmin [asadmin-options] enable-http-lb-server [--help] 
target
----

[[sthref1112]]

Description

The `enable-http-lb-server` subcommand enables a standalone server
instance or cluster for load balancing. By default, load balancing is
enabled for instances and clusters.


[NOTE]
=======================================================================

This subcommand is only applicable to Oracle GlassFish Server. This
subcommand is not applicable to GlassFish Server Open Source Edition.

=======================================================================


[[sthref1113]]

Options

asadmin-options::
  Options for the `asadmin` utility. For information about these
  options, see the link:asadmin.html#asadmin-1m[`asadmin`(1M)] help page.
`--help`::
`-?`::
  Displays the help text for the subcommand.

[[sthref1114]]

Operands

target::
  This operand specifies which server instances and clusters to enable.
  Valid values are: +
  * cluster_name- The name of a target cluster.
  * instance_name- The name of a target server instance.

[[sthref1115]]

Examples

[[GSRFM602]][[sthref1116]]

Example 1   Enabling a Cluster for Load Balancing

This example enables load balancing for a cluster named `mycluster`.

[source,oac_no_warn]
----
asadmin> enable-http-lb-server mycluster

Command enable-http-lb-server executed successfully.
----

[[sthref1117]]

Exit Status

0::
  subcommand executed successfully
1::
  error in executing the subcommand

[[sthref1118]]

See Also

link:asadmin.html#asadmin-1m[`asadmin`(1M)]

link:create-http-lb-ref.html#create-http-lb-ref-1[`create-http-lb-ref`(1)],
link:disable-http-lb-server.html#disable-http-lb-server-1[`disable-http-lb-server`(1)]


